)c (GeV/ Tp 0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5 efficiency × Acceptance

0

0.2

0.4

0.6

0.8

1 pp d

ITS+TPC tracking Incl. TOF match

ALICE